UPDATE ConfigurationAdmin SET ValueList = 'ReviewText=la_common_ReviewText,CreatedOn=la_common_CreatedOn' WHERE VariableName = 'Link_ReviewsSort2';
INSERT INTO ConfigurationAdmin VALUES ('Perpage_LinkReviews_Short', 'la_Text_Reviews', 'la_review_perpage_short_prompt', 'text', NULL, NULL, 20.04, 0, 1);
ALTER TABLE Link CHANGE CachedReviewsQty CachedReviewsQty INT(11) NOT NULL DEFAULT '0';

INSERT INTO ConfigurationAdmin VALUES ('l_MaxImageCount', 'la_section_ImageSettings', 'la_config_MaxImageCount', 'text', '', '', 40.01, 0, 0);
INSERT INTO ConfigurationAdmin VALUES ('l_ThumbnailImageWidth', 'la_section_ImageSettings', 'la_config_ThumbnailImageWidth', 'text', '', '', 40.02, 0, 0);
INSERT INTO ConfigurationAdmin VALUES ('l_ThumbnailImageHeight', 'la_section_ImageSettings', 'la_config_ThumbnailImageHeight', 'text', '', '', 40.03, 0, 0);
INSERT INTO ConfigurationAdmin VALUES ('l_FullImageWidth', 'la_section_ImageSettings', 'la_config_FullImageWidth', 'text', '', '', 40.04, 0, 0);
INSERT INTO ConfigurationAdmin VALUES ('l_FullImageHeight', 'la_section_ImageSettings', 'la_config_FullImageHeight', 'text', '', '', 40.05, 0, 0);

INSERT INTO ConfigurationValues VALUES (DEFAULT, 'l_MaxImageCount', 5, 'In-Link', 'in-link:configuration_output');
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'l_ThumbnailImageWidth', 120, 'In-Link', 'in-link:configuration_output');
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'l_ThumbnailImageHeight', 120, 'In-Link', 'in-link:configuration_output');
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'l_FullImageWidth', 450, 'In-Link', 'in-link:configuration_output');
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'l_FullImageHeight', 450, 'In-Link', 'in-link:configuration_output');

UPDATE Modules SET Version = '4.2.0' WHERE Name = 'In-Link';